NCEP Wind Stress, AX8 Sep 2015

1 dyne cm^{-2}

80^oW 60^oW 40^oW 20^oW 0^o 20^oE

30^oS

15^oS

0^o

15^oN

30^oN

45^oN

0.5 1 1.5 2 2.5 3 3.5 4 4.5