5 10 15 20 25

0

100

200

300

400

500

600

700

800 Temperature (^oC)

Depth (m)

01212788

XBT CTD_{down} CTD_{up} -15 -10 -5 0

0

100

200

300

400

500

600

700

XBT - CTD (^oC)