0 20 40 60 80 100 120 -30 -20 -10 0 10 20 30 Molly/MDT1182119

Time [s]

T [degC] original wire imbalance thermistor calibration time constant

50 55 60 18

18.5

0 20 40 60 80 100 120 -15

-10

-5

0 Molly/MDT1182119

ΔT [degC]

Time [s]