-0.1 -0.05 0 0.05

0

100

200

300

400

500

600

700

800 DTdz

Depth(m)

CTD XBT CORREC

-1 0 1 2

0

20

40

60

80

100

120

140

160

180

200 T_{xbt}-T_{CTD}

Section = 5,T0=0.07,Zd=-0.92,Z0=101.17,TS=0.31,GD=0

-20 0 20

0

100

200

300

400

500

600

700

800 Z_{xbt}-Z_{CTD}