S θ

35.0°S 25 25.5 26

27 27.2

27.3 27.4 28

34.5 35 35.5

5

10

15 34.35 34.45 3 4 5 6

S θ

30.0°S 24 24.5 26 27 27.2 27.4 27.3 28 28.5

26.5

34.5 35 35.5

5

10

15

20

34.4 34.5 3 4 5 6

S θ

20.0°S 23 24 25 26 26.5

27 27.2

27.4 28 28.5

34.5 35 35.5 36 36.5 37 0 5 10 15 20 25

34.45 34.55 3 4 5 6

S θ

10.0°S 22.5 24

26.5 27 27.3 27.4 28

27.2

28.5 26

34.5 35 35.5 36 36.5 37 0 5 10 15 20 25

34.5 34.6 4 5 6

1960 1970 1980 1990 2000