-0.7 -0.35 0 0.35 0.7

34.7

35.4

36.1

36.8

37.5

S1

PNE11: CTD1 - UCTD27

-0.7 -0.35 0 0.35 0.7

34.7

35.4

36.1

36.8

37.5

PNE11: CTD1 - UCTD27

-0.7 -0.35 0 0.35 0.7

34.7

35.4

36.1

36.8

37.5

S2

-0.7 -0.35 0 0.35 0.7

34.7

35.4

36.1

36.8

37.5

-0.7 -0.35 0 0.35 0.7 4 9 14 19 24 29

T1 [°C]

-0.7 -0.35 0 0.35 0.7 4 9 14 19 24 29

-0.7 -0.35 0 0.35 0.7 4 9 14 19 24 29

T2 [°C]

-0.7 -0.35 0 0.35 0.7 4 9 14 19 24 29

-0.7 -0.35 0 0.35 0.7

0 300 600 900 1200 1500 ΔT_1 [°C]

P [dbar] mean: -0.01°C std: 0.18°C

-0.7 -0.35 0 0.35 0.7

0 300 600 900 1200 1500 ΔT_2 [°C] mean: -0.01°C std: 0.18°C