0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006 R.V. Seward Johnson CTD Station 31 (CTD031) 01-Oct-2006 08:17 Z

Latitude 26.502 N Longitude 73.868 W

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006 R.V. Seward Johnson CTD Station 32 (CTD032)

01-Oct-2006 13:20 Z

Latitude 26.500 N Longitude 73.500 W

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006 R.V. Seward Johnson CTD Station 33 (CTD033) 01-Oct-2006 18:48 Z

Latitude 26.501 N Longitude 73.128 W

499 399 298 197 122 48 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

Potential Temperature (deg C)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006 R.V. Seward Johnson CTD Station 34 (CTD034)

02-Oct-2006 00:15 Z

Latitude 26.501 N Longitude 72.766 W

5209

4598

4197

3798

3398

2998

2747

2498

2248

1999

1748

1497

1248

998 796 648 498 398 298 199 123 47 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006 R.V. Seward Johnson CTD Station 35 (CTD035)

02-Oct-2006 05:40 Z

Latitude 26.502 N Longitude 72.383 W

5271

4996

4496

3998

3497

2998

2743

2497

2247

1996

1747

1496

1247

996 796 646 498 397 297 198 122 47 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006 R.V. Seward Johnson CTD Station 36 (CTD036)

02-Oct-2006 18:27 Z

Latitude 26.498 N Longitude 71.992 W

5371

4992

4497

3997

3497

2998

2744

2497

2248

1998

1749

1500

1248

998 799 649 499 398 297 197 122 48 0

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006 R.V. Seward Johnson CTD Station 37 (CTD037)

03-Oct-2006 01:57 Z

Latitude 26.499 N Longitude 72.004 W

2499

1994

1498

998

797

499

298

98 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006 R.V. Seward Johnson CTD Station 38 (CTD038)

03-Oct-2006 05:34 Z

Latitude 26.503 N Longitude 71.996 W

5372

4996

3996

2994

2000

1498

998

600 398 198 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006 R.V. Seward Johnson CTD Station 39 (CTD039) 06-Oct-2006 18:33 Z

Latitude 26.501 N Longitude 76.088 W

4867

4299

3496

2796

1998

1498

997

598

399

197

1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

Potential Temperature (deg C)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006 R.V. Seward Johnson CTD Station 40 (CTD040)

06-Oct-2006 23:40 Z

Latitude 26.501 N Longitude 76.465 W

3495

3000

2499

1988

1501

1002

800

598

398

196

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006 R.V. Seward Johnson CTD Station 41 (CTD041) 08-Oct-2006 01:42 Z

Latitude 26.502 N Longitude 76.467 W

4900

4097

3595

2797

1999

1495

999

597

297 123 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

Potential Temperature (deg C)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006 R.V. Seward Johnson CTD Station 42 (CTD042)

08-Oct-2006 23:24 Z

Latitude 26.500 N Longitude 76.744 W

1997

2498

2998

3501

1500

997

799

602

398

198

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)