0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 26 (CTD026)

28-Sep-2004 22:07 Z

Latitude 26.500 N Longitude 74.235 W

4602

3998

3499

2999

2598

2297

1998

1798

1599

1398

1199

999 899 799 698 598 499 399 299 199 99 48 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 27 (CTD027)

29-Sep-2004 02:58 Z

Latitude 26.500 N Longitude 74.496 W

4536

3999

3499

2998

2599

1999

1797

1599

1400

1200

1000 898 799 700 578 500 400 299 199 148 100 48 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 28 (CTD028)

29-Sep-2004 08:16 Z

Latitude 26.499 N Longitude 74.782 W

4578

4000

3497

3199

2799

2400

1998

1799

1599

1399

1199

998 899 800 698 598 500 398 301 199 147 99 49 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 29 (CTD029)

29-Sep-2004 12:58 Z

Latitude 26.485 N Longitude 75.076 W

4668

3998

3500

3000

2599

2298

2000

1799

1600

1399

1198

997 898 798 698 597 498 400

198 150 99 50 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 30 (CTD030)

29-Sep-2004 17:26 Z

Latitude 26.500 N Longitude 75.308 W

4702

3997

3495

2999

2599

2299

1998

1799

1498

1199

999 898 799 698 598 498 398 298 184 149 98 49

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 31 (CTD031)

29-Sep-2004 22:03 Z

Latitude 26.500 N Longitude 75.516 W

4747

3998

3498

2999

2298

1999

1798

1399

1099

898 799 696 599 499 398 299 198 148 48 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 32 (CTD032)

30-Sep-2004 04:57 Z

Latitude 26.501 N Longitude 75.910 W

4811

4398

4000

3588

2798

2377

1598

998 900 799

599 499 400 300 199 97 65 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 33 (CTD033)

30-Sep-2004 12:13 Z

Latitude 26.498 N Longitude 75.703 W

4500

2398

1948

1476

1198

998 847 698 598 500 398 299 194 98 48 2 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 34 (CTD034)

30-Sep-2004 23:17 Z

Latitude 26.501 N Longitude 76.095 W

299 199 149 99 49 2

4871

4499

4197

3698

3198

2698

2198

1719

1599

1298

1199

998 898 798 699 548 399

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 35 (CTD035)

01-Oct-2004 03:41 Z

Latitude 26.500 N Longitude 76.210 W

4879

4299

3788

3274

2799

2399

1999

1798

1599

1399

1198

999 900 799 690 599 499 400 299 248 179 99 49 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 36 (CTD036)

01-Oct-2004 08:38 Z

Latitude 26.499 N Longitude 76.300 W

4899

4399

4000

3598

3198

2799

2398

2000

1698

1399

1198

999 899 798 699 599 500 389 299 206 149 99 48 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 37 (CTD037)

01-Oct-2004 12:56 Z

Latitude 26.500 N Longitude 76.375 W

4909

4498

3999

3499

3000

2499

1999

1799

1600

1400

1199

999 900 798 698 598 499 398 298 199 148 98 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 38 (CTD038)

01-Oct-2004 18:12 Z

Latitude 26.500 N Longitude 76.467 W

4899

4499

4198

3698

3198

2698

2198

1798

1598

1400

1199

998 899 798 699 599 499 398 299 198 148 98 49 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 39 (CTD039)

01-Oct-2004 22:28 Z

Latitude 26.500 N Longitude 76.567 W

4896

4098

3498

2999

2299

1999

1799

1400

1200

999 898 799 699 598 499 399 298 198 149 98 60 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 40 (CTD040)

02-Oct-2004 02:46 Z

Latitude 26.500 N Longitude 76.667 W

4624

4000

3598

3198

2399

1797

1496

1200

998 900 800 698 599 500 399 299 200 149 99 49 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 41 (CTD041)

02-Oct-2004 07:39 Z

Latitude 26.517 N Longitude 76.900 W

538

390

299

219

149

99

49

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 42 (CTD042)

02-Oct-2004 10:46 Z

Latitude 26.500 N Longitude 76.767 W

3604

2799

2000

1400

900

749

600

449 348 209 148 48 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)