0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 20 (CTD020)

27-Sep-2004 12:01 Z

Latitude 26.500 N Longitude 72.007 W

5364

4819

4291

3799

3300

2799

2299

1798

1550

1399

1198 999 898 797 695 598 498 399 298 210 151 98 48 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 21 (CTD021)

27-Sep-2004 18:21 Z

Latitude 26.497 N Longitude 72.497 W

5286

4161

3240

2729

2198

1798

1397

986 899 698 499 298 199 148 99 50 2 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 22 (CTD022)

27-Sep-2004 23:24 Z

Latitude 26.500 N Longitude 72.847 W

5208

4698

4199

3699

3200

2699

2201

1799

1597

1398

1199 998 898 798 698 599 498 399 299 199 148 99 49 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 23 (CTD023)

28-Sep-2004 04:37 Z

Latitude 26.500 N Longitude 73.195 W

5112

4698

4298

3808

3300

2800

2298

1750

1599

1399

1198 999 899 799 699 600 500 399 300 199 149 99 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 24 (CTD024) 28-Sep-2004 10:49 Z

Latitude 26.500 N Longitude 73.564 W

4975

4498

3999

3499

2998

2499

2000

1698

1499

1288

1099 999 900 798 699 599 499 399 300 199 149 99 50 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2004 NOAA Ship Ronald H. Brown CTD Station 25 (CTD025)

28-Sep-2004 16:36 Z

Latitude 26.500 N Longitude 73.927 W

4751

4397

4197

3698

3198

2699

2197

1798

1598

1398

1199

998 900 799 699 599 498 399 299 199 148 98 2 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)