0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 36 (CTD036)

17-May-2005 04:04 Z

Latitude 26.497 N Longitude 71.976 W

3004

2497

2001

1501

1001

799

599

399

226

49 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 37 (CTD037)

18-May-2005 06:16 Z

Latitude 26.502 N Longitude 69.998 W

5577

4997

4497

3998

3498

2998

2750

2448

2147

1848

1547

1248

1047 898 748 598 472 348 273 198 148 98 48 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 38 (CTD038)

18-May-2005 12:43 Z

Latitude 26.500 N Longitude 70.500 W

5576

4998

4498

3999

3498

2999

2748

2449

2148

1848

1537

1248

1048 898 749 598

347 273 199 148 98 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 39 (CTD039)

18-May-2005 19:02 Z

Latitude 26.502 N Longitude 71.000 W

5571

4497

4244

3848

3498

3147

2838

2499

2148

1847

1548

1247

1047 898

598 470 348 272 198 142 98 48 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 40 (CTD040)

19-May-2005 01:10 Z

Latitude 26.502 N Longitude 71.501 W

5501

4498

4248

3498

3147

2747

2449

2147

1846

1547

1248

1044 897

599 469 347 198 272 147 98 48 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 41 (CTD041)

19-May-2005 08:01 Z

Latitude 26.501 N Longitude 71.993 W

5365

4497

4248

3837

3498

3148

2748

2448

2149

1847

1546

1248

1048 899 748 598 472 347 271 198 147 97 48 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 42 (CTD042)

19-May-2005 14:06 Z

Latitude 26.500 N Longitude 72.386 W

5255

4499

4248

3849

3497

2743

2447

2149

1547

1247

1048 898 748 597 472 344 272 198 148 80 47 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 43 (CTD043)

19-May-2005 19:41 Z

Latitude 26.503 N Longitude 72.769 W

5198

4499

4248

3848

3500

3148

2449

2149

1849

1550

1249

1049 900 749 599 448 349 274 199 149 99 49 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 44 (CTD044)

20-May-2005 00:54 Z

Latitude 26.502 N Longitude 73.134 W

5122

4499

4248

3846

3497

3147

2747

2447

2147

1849

1548

1047 897 748 598

348 274 196 148 99 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 45 (CTD045)

20-May-2005 06:14 Z

Latitude 26.500 N Longitude 73.501 W

5029

4495

4247

3848

3498

3148

2748

2430

2148

1848

1548

1248

1048 899 749

348 273 198 148 98 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 46 (CTD046)

20-May-2005 11:22 Z

Latitude 26.500 N Longitude 73.868 W

4793

4498

4248

3848

3498

3148

2748

2449

2149

1848

1549

1248

1047 898

598 469 349 273 198 148 98 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 47 (CTD047)

20-May-2005 16:13 Z

Latitude 26.499 N Longitude 74.234 W

4595

4498

4227

3848

3497

3147

2748

2447

2147

1848

1548

1248

1048 897

597 472 348 270 199 48 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 48 (CTD048)

20-May-2005 20:55 Z

Latitude 26.499 N Longitude 74.515 W

4547

4498

4248

3847

3498

3146

2748

2449

2148

1848

1548

1246

1048 898 748 598 473 348 268 199 98 48 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 49 (CTD049)

21-May-2005 01:33 Z

Latitude 26.500 N Longitude 74.799 W

4592

4498

4248

3849

3499

3149

2748

2449

2148

1848

1546

1247

1047

747 597 471 348 273 198 148 98 48 4

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 50 (CTD050)

21-May-2005 06:15 Z

Latitude 26.500 N Longitude 75.083 W

4668

4297

3998

3698

3398

3099

2748

2449

1548

1848

2149

1049 898 748 599 473 349 267 198 148 98 47 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 51 (CTD051)

21-May-2005 10:25 Z

Latitude 26.500 N Longitude 75.301 W

4696

4300

3999

3699

3398

3098

2749

2447

2149

1849

1548

1248

1049 898 749 599

349 274 198 149 98 49 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 52 (CTD052)

21-May-2005 14:38 Z

Latitude 26.498 N Longitude 75.501 W

4741

4298

3998

3698

3398

3097

2747

2449

2097

1848

1548

1247

1048 898 749 598

347 197 148 99 48 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 53 (CTD053)

21-May-2005 19:05 Z

Latitude 26.500 N Longitude 75.708 W

4749

3997

2998

2499

1999

1597

1297

798

588

398 249 149 99 48 48 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 54 (CTD054)

21-May-2005 23:16 Z

Latitude 26.501 N Longitude 75.867 W

4795

4498

3998

3499

2998

2498

1999

1599

1298

798

599

399 247 147 94 46 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 55 (CTD055)

22-May-2005 06:21 Z

Latitude 26.502 N Longitude 76.070 W

4867

3999

3498

2998

2498

1999

1598

1299

999

798

598

398 248 148 98 49 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 56 (CTD056)

22-May-2005 10:50 Z

Latitude 26.502 N Longitude 76.180 W

4884

4000

3499

2999

2499

1999

1599

1299

998

798

398 248 148 98 98 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 57 (CTD057)

22-May-2005 14:59 Z

Latitude 26.502 N Longitude 76.326 W

4891

4498

3998

3497

2998

2497

1998

1598

999

798

598

398 247 148 98 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 58 (CTD058) 22-May-2005 19:25 Z

Latitude 26.502 N Longitude 76.478 W

4921

4497

3997

3498

2999

2498

1998

1599

1298

998

778 597

399 249 149 49 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 59 (CTD059)

22-May-2005 23:43 Z

Latitude 26.500 N Longitude 76.570 W

4888

3998

3498

2998

1999

1599

1297

998

799

596

398 249 149 98 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 60 (CTD060)

23-May-2005 03:53 Z

Latitude 26.501 N Longitude 76.664 W

4514

3998

3498

2999

2497

2248

1998

1747

1497

1247

999

497

248 148 97 48 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 61 (CTD061) 23-May-2005 07:45 Z

Latitude 26.500 N Longitude 76.757 W

3916

2999

2498

2000

1297

798

598

399 248 148 97 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

200

400

600

800

1000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 62 (CTD062)

23-May-2005 12:00 Z

Latitude 26.515 N Longitude 76.835 W

1045

798

398

249

99

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

350

400

450

500 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 63 (CTD063) 23-May-2005 13:30 Z

Latitude 26.525 N Longitude 76.885 W

405

298

199

148

98

48

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

350

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 64 (CTD064)

24-May-2005 03:08 Z

Latitude 26.067 N Longitude 78.850 W

198

248

148

98

1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

350

400

450

500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 65 (CTD065)

24-May-2005 04:23 Z

Latitude 26.166 N Longitude 78.798 W

441

368

178

78

28

1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 66 (CTD066) 24-May-2005 05:35 Z

Latitude 26.250 N Longitude 78.766 W

504

268

188

138

38

1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 67 (CTD067)

24-May-2005 06:49 Z

Latitude 26.333 N Longitude 78.717 W

670

508

428

348

273

189

139

88

47

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

800

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 68 (CTD068)

24-May-2005 08:17 Z

Latitude 26.433 N Longitude 78.668 W

748

498

428

348

188

138

1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 69 (CTD069)

24-May-2005 13:14 Z

Latitude 27.000 N Longitude 79.200 W

466

388

329

257

178

125

78

1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2005/1 RV Knorr CTD Station 70 (CTD070)

24-May-2005 14:26 Z

Latitude 27.000 N Longitude 79.283 W

499

399

319

248

132

89

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)