0 5 10 15 20 25 30

0

200

400

600

800

1000

1200

1400

1600

1800

2000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 0 (CTD000)

12-Mar-2006 14:47 Z

Latitude 24.465 N Longitude 67.558 W

1999 2000 2001

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 1 (CTD001)

13-Mar-2006 05:02 Z

Latitude 26.503 N Longitude 69.501 W

5423

5087

4558

4035

3515

2996

2477

1703

1445

1239

1032 930 828 724 622 469 366 264 161 110 54 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 2 (CTD002)

13-Mar-2006 11:37 Z

Latitude 26.499 N Longitude 70.001 W

3827

4347

4867

5586

3306

2788

2270

1857

1599

1341

1136 982 879 775 673 570 407 284 231 182 127 62 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 3 (CTD003)

13-Mar-2006 18:23 Z

Latitude 26.499 N Longitude 70.500 W

5576

5000

4500

4000

3499

3000

2500

2000

1670

1070 918

519 620 719 819

370 305 249 63 124 2 184

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 4 (CTD004)

14-Mar-2006 01:05 Z

Latitude 26.501 N Longitude 71.000 W

5576

4898

4348

3850

3349

2850

2350

1849

1609

1237

1031 918 815 713 610 507

241 175 118 52 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 5 (CTD005)

14-Mar-2006 07:38 Z

Latitude 26.500 N Longitude 71.501 W

3824

4867

4345

3305

2786

2269

1856

1598

1340

1134 980 877 775 672 570 405 231 180 130 63 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 6 (CTD006)

14-Mar-2006 14:50 Z

Latitude 26.502 N Longitude 72.009 W

5367

4573

3999

3500

2998

2500

2000

1669

1280

1069 918 818 619

369 333 249 184 124 2 64

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 7 (CTD007)

14-Mar-2006 22:17 Z

Latitude 26.500 N Longitude 72.384 W

5259

4899

4350

3849

3348

2848

2348

1850

1600

1350

1200 999 891 789 689 589 490 359 230 164 109 46 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 8 (CTD008)

15-Mar-2006 04:20 Z

Latitude 26.499 N Longitude 72.768 W

5215

4867

4345

3824

3304

2786

2269

1856

1597

1135 980 877 774 673 569 406 282 179 128 61 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 9 (CTD009)

15-Mar-2006 10:25 Z

Latitude 26.503 N Longitude 73.149 W

5126

5068

4493

3973

3455

2936

2421

1906

1650

1392

1237

1031 917 816 711 589 476 354 226 159 103 42 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 10 (CTD010)

15-Mar-2006 16:44 Z

Latitude 26.499 N Longitude 73.533 W

5013

4698

4197

3698

3200

2698

2198

1798

1548

1297

1096 948 838 745 648 548 388 268 218 168 119 52 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 11 (CTD011)

15-Mar-2006 22:35 Z

Latitude 26.499 N Longitude 73.916 W

4766

4699

4199

3199

2701

2198

1800

1300

1100 947 849 749 648 548 390 269 219 169 119 34 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 12 (CTD012)

16-Mar-2006 04:05 Z

Latitude 26.500 N Longitude 74.231 W

4602

4447

4198

3700

3200

2700

2197

1798

1551

948 850 749 648 549 388 269 218 168 53

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 13 (CTD013)

16-Mar-2006 08:57 Z

Latitude 26.501 N Longitude 74.515 W

4557

3999

3500

2998

2500

1999

1669

1076 969 919 820 711 620 519 419 350 299 250 200 99 45 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 14 (CTD014)

16-Mar-2006 14:22 Z

Latitude 26.499 N Longitude 74.799 W

4602

4501

3980

3461

2425

2064

1856

1650

1443

1237

1032 918 778 689

489 358 290 228 100 48

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 15 (CTD015)

16-Mar-2006 19:16 Z

Latitude 26.499 N Longitude 75.082 W

4669

4102

3700

3298

2898

2499

2098

1817

1547

1299

1099 948

747 648 549 439 328 250 173 119 54 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 16 (CTD016)

17-Mar-2006 01:41 Z

Latitude 26.500 N Longitude 75.300 W

4700

4223

3850

3450

3048

2649

2248

1898

1648

1372

1201

1000 883 785 683 584 483 360

158 108 109 43 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 17 (CTD017)

17-Mar-2006 06:25 Z

Latitude 26.500 N Longitude 75.500 W

4751

4098

3700

3298

2899

2530

2099

1549

1800

1298

1099 948 849 747 649 548 438 328 173 120 53 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 18 (CTD018)

17-Mar-2006 10:58 Z

Latitude 26.499 N Longitude 75.703 W

4759

4129

3681

3296

2878

2464

2051

1744

1488

1285

1080 948 846 744 641 538

324 278 201 139 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 19 (CTD019)

17-Mar-2006 15:21 Z

Latitude 26.504 N Longitude 75.867 W

4802

4249

3849

3449

3049

2644

2248

1899

1650

1374

1200

999 878 783 684 582 483 358 234 108 30 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 20 (CTD020)

17-Mar-2006 19:44 Z

Latitude 26.500 N Longitude 75.999 W

4860

4248

3848

3448

3048

2649

2243

1900

1649

1375

1199

1000 883 785 684 583 483 359 233 159 107 42 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 21 (CTD021)

18-Mar-2006 00:12 Z

Latitude 26.499 N Longitude 76.096 W

4872

4100

3700

3299

2899

2498

2098

1799

548 440 329 249 174 127 54 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 22 (CTD022)

18-Mar-2006 04:25 Z

Latitude 26.501 N Longitude 76.216 W

4879

4000

3599

3199

2799

2399

1999

1694

1449

1249

1049 919 819 719 618 519 390 309 249 189 129 64 64 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 23 (CTD023) 18-Mar-2006 08:58 Z

Latitude 26.500 N Longitude 76.349 W

4916

4396

3979

3563

3147

2733

2319

1957

1700

1236

1030 902 809 706 603 501 374 245 118 51 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 24 (CTD024)

18-Mar-2006 13:08 Z

Latitude 26.500 N Longitude 76.466 W

4911

4239

3823

3407

2992

2578

2164

1854

1596

1339

1133 980 877 762 671 550 457 344 262 184 129 63 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 25 (CTD025)

18-Mar-2006 17:28 Z

Latitude 26.500 N Longitude 76.550 W

4906

3999

3599

3199

2799

2399

1999

1699

1449

1248

1048 918 818 729 559 469 390 309 263 189 129 65 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 26 (CTD026)

18-Mar-2006 22:11 Z

Latitude 26.507 N Longitude 76.633 W

3448

3828

3827

3050

2645

2248

1898

1636

1370

1199

999 884 785 685 584 483 359

157 108 44 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 27 (CTD027)

19-Mar-2006 02:43 Z

Latitude 26.500 N Longitude 76.717 W

4145

4053

3700

3299

2906

2507

2100

1799

1550

1336

1125 978 875 772 670 567 454 342 260 184 128 61 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 28 (CTD028)

19-Mar-2006 06:27 Z

Latitude 26.500 N Longitude 76.766 W

3619

3299

2898

2498

2100

1799

1549

1299

1100

949 849 749 649 549 439 329 249 120 59 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

200

400

600

800

1000

1200 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 29 (CTD029) 19-Mar-2006 09:54 Z

Latitude 26.515 N Longitude 76.832 W

929

836

733

630

525

392

315

266

196

136

69

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 30 (CTD030)

19-Mar-2006 11:41 Z

Latitude 26.516 N Longitude 76.899 W

565

514

360

283

207

126

59

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

20

40

60

80

100

120

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 31 (CTD031)

19-Mar-2006 13:01 Z

Latitude 26.517 N Longitude 76.934 W

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

200

400

600

800

1000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 32 (CTD032)

19-Mar-2006 20:00 Z

Latitude 26.516 N Longitude 76.984 W

1083

899

798

698

600

500

349

201

99

50

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 33 (CTD033)

20-Mar-2006 00:59 Z

Latitude 26.500 N Longitude 76.468 W

4913

3999

3500

2999

2498

1999

1738

713

248

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 34 (CTD034)

20-Mar-2006 06:50 Z

Latitude 26.500 N Longitude 76.468 W

2099

1799

1542

1276

1098

848

648

438

249

118 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 35 (CTD035)

21-Mar-2006 04:48 Z

Latitude 26.500 N Longitude 75.705 W

4756

3198

2398

1699

1249

919

618

388 263

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 36 (CTD036)

21-Mar-2006 09:41 Z

Latitude 26.500 N Longitude 76.029 W

2999

2499

1999

1500

1099

782 674

484

233 159 44

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 37 (CTD037)

22-Mar-2006 00:25 Z

Latitude 26.501 N Longitude 76.612 W

3042

2249

1699

900

698

499 399

248

109 1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 38 (CTD038)

22-Mar-2006 06:40 Z

Latitude 26.500 N Longitude 76.094 W

4873

3698

2498

1798

1299

948

648

438 248 118 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 39 (CTD039)

22-Mar-2006 23:20 Z

Latitude 26.500 N Longitude 76.096 W

2998

2773

2224

1999

1774

1159

1000

799

399

199

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 40 (CTD040) 23-Mar-2006 04:37 Z

Latitude 26.499 N Longitude 76.467 W

4915

3798

2998

1998

1298

898

698

499

298

84 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

800

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 41 (CTD041)

24-Mar-2006 13:18 Z

Latitude 26.433 N Longitude 78.667 W

750

650

550

450

350

269

200

148

100

50

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 42 (CTD042)

24-Mar-2006 15:04 Z

Latitude 26.332 N Longitude 78.716 W

685

598

498

399

309

229

178

134

84

39

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 43 (CTD043)

24-Mar-2006 16:37 Z

Latitude 26.249 N Longitude 78.767 W

514

400

299

209

144

93

44

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

350

400

450

500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 44 (CTD044)

24-Mar-2006 18:00 Z

Latitude 26.167 N Longitude 78.800 W

442

369

260

174

124

75

29

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

350

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 45 (CTD045)

24-Mar-2006 22:43 Z

Latitude 26.064 N Longitude 78.847 W

285

248

189

139

90

49

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

350

400 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 46 (CTD046) 25-Mar-2006 01:22 Z

Latitude 26.049 N Longitude 79.229 W

301

248

199

86

50

24

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 47 (CTD047)

25-Mar-2006 02:42 Z

Latitude 26.051 N Longitude 79.311 W

470

378

279

192

141

90

39

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 48 (CTD048)

25-Mar-2006 04:03 Z

Latitude 26.051 N Longitude 79.397 W

575

478

385

300

219

170

118

70

30

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 49 (CTD049)

25-Mar-2006 05:32 Z

Latitude 26.048 N Longitude 79.480 W

32

89

148

203

258

328

399

488

558

663

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

800

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 50 (CTD050)

25-Mar-2006 07:05 Z

Latitude 26.045 N Longitude 79.567 W

150

50

3

269

349

449

549

754

648

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 51 (CTD051)

25-Mar-2006 08:40 Z

Latitude 26.044 N Longitude 79.663 W

691

588

410

335

263

189

124

74

39

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 52 (CTD052) 25-Mar-2006 10:25 Z

Latitude 26.035 N Longitude 79.747 W

607

480

328

198

149

89

44

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

350

400

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 53 (CTD053)

25-Mar-2006 11:56 Z

Latitude 26.041 N Longitude 79.848 W

311

198

107

57

24

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

350 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 54 (CTD054)

25-Mar-2006 13:10 Z

Latitude 26.041 N Longitude 79.936 W

250

154

29

69

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 55 (CTD055)

25-Mar-2006 14:11 Z

Latitude 26.034 N Longitude 79.999 W

77

39

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 56 (CTD056)

25-Mar-2006 15:03 Z

Latitude 26.050 N Longitude 80.065 W

121

88

71

34

4

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 57 (CTD057)

25-Mar-2006 22:15 Z

Latitude 26.999 N Longitude 79.933 W

69

34

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 58 (CTD058)

25-Mar-2006 23:26 Z

Latitude 27.000 N Longitude 79.869 W

241

220

88

48

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

350

400

450

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 59 (CTD059)

26-Mar-2006 00:48 Z

Latitude 26.996 N Longitude 79.785 W

365

301

229

169

119

76

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 60 (CTD060)

26-Mar-2006 02:20 Z

Latitude 26.993 N Longitude 79.685 W

522

429

339

259

199

148

101

58

19 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 61 (CTD061)

26-Mar-2006 04:06 Z

Latitude 26.991 N Longitude 79.617 W

636

560

490

418

269

189

140

35 35

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

800

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 62 (CTD062)

26-Mar-2006 06:01 Z

Latitude 26.986 N Longitude 79.501 W

743

651

554

438

337

259

149

88

48

4

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 63 (CTD063)

26-Mar-2006 07:50 Z

Latitude 26.992 N Longitude 79.384 W

648

573

477

373

299

224

174

74

28

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 64 (CTD064) 26-Mar-2006 09:13 Z

Latitude 26.994 N Longitude 79.284 W

602

499

399

319

250

189

134

88

44

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 65 (CTD065)

26-Mar-2006 10:31 Z

Latitude 26.994 N Longitude 79.200 W

481

378

308

238

168

108

78

33

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 66 (CTD066)

26-Mar-2006 13:43 Z

Latitude 26.996 N Longitude 79.615 W

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 67 (CTD067)

26-Mar-2006 17:02 Z

Latitude 26.991 N Longitude 79.617 W

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 68 (CTD068)

26-Mar-2006 20:25 Z

Latitude 26.993 N Longitude 79.617 W

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 69 (CTD069)

26-Mar-2006 23:46 Z

Latitude 26.003 N Longitude 79.633 W

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 70 (CTD070)

27-Mar-2006 03:06 Z

Latitude 27.003 N Longitude 79.615 W

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 71 (CTD071)

27-Mar-2006 06:28 Z

Latitude 26.995 N Longitude 79.617 W

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2006/1 NOAA Ship Ronald H. Brown CTD Station 72 (CTD072)

27-Mar-2006 09:42 Z

Latitude 26.992 N Longitude 79.617 W

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)