0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2002 NOAA Ship Ronald H. Brown CTD Station 1 (CTD001)

20-Jun-2002 06:10 Z

Latitude 26.502 N Longitude 69.431 W

5466

5142

4751

4349

3947

3572

3199

2848

2173

1748

1498

1247

1047 848 697

347 248 98 47 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2002 NOAA Ship Ronald H. Brown CTD Station 2 (CTD002)

20-Jun-2002 12:03 Z

Latitude 26.500 N Longitude 69.833 W

5519

4799

4399

3998

3624

3250

2223

1799

1548

1298

1074 874 723 573 473 373 258 183 109 59 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2002 NOAA Ship Ronald H. Brown CTD Station 3 (CTD003)

20-Jun-2002 18:01 Z

Latitude 26.499 N Longitude 70.234 W

5525

5190

4675

4263

3854

3497

3189

2374

1920

1574

1323

1100 899 749 599 499 383 274 178 113 63 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2002 NOAA Ship Ronald H. Brown CTD Station 4 (CTD004)

21-Jun-2002 00:01 Z

Latitude 26.500 N Longitude 70.683 W

5525

5002

4573

4111

3702

3241

2835

2427

2070

1817

1573

1325

1098 892

593 482 361 241 171 94 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2002 NOAA Ship Ronald H. Brown CTD Station 5 (CTD005)

21-Jun-2002 05:20 Z

Latitude 26.500 N Longitude 71.000 W

5519

4897

4450

3998

3549

3099

2698

2298

1949

1773

1548

1323

1098 898 747 599 488 369 249 183 109

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2002 NOAA Ship Ronald H. Brown CTD Station 6 (CTD006)

21-Jun-2002 11:14 Z

Latitude 26.500 N Longitude 71.333 W

5515

5000

4547

4099

3648

3248

2848

2449

2048 2049

1699

1473

1300

1074

721 573 457 342 229 159 99 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2002 NOAA Ship Ronald H. Brown CTD Station 7 (CTD007)

21-Jun-2002 17:16 Z

Latitude 26.499 N Longitude 71.731 W

5463

5152

4764

4324

3974

3554

3161

2754

2554

2173

1853

1523

1273

1054 865 754 554 474 354 264 174 114 64 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2002 NOAA Ship Ronald H. Brown CTD Station 8 (CTD008)

21-Jun-2002 22:37 Z

Latitude 26.498 N Longitude 72.099 W

5359

4849

4500

4149

3749

3399

3048

2698

2398

2099

1799

1499

1215

949

649 524 409 318 228 101 74

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2002 NOAA Ship Ronald H. Brown CTD Station 9 (CTD009)

22-Jun-2002 03:47 Z

Latitude 26.500 N Longitude 72.467 W

5255

4689

4390

4088

3788

3489

3189

2890

2588

2290

1988

1689

1389

1088

859 708 559 434 333 254 133 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2002 NOAA Ship Ronald H. Brown CTD Station 10 (CTD010)

22-Jun-2002 09:20 Z

Latitude 26.500 N Longitude 72.833 W 2 208 289 319 449 649 775 899 1048

1298

1547

1849

2148

2498

2798

3098

3449

3797

4097

4499

5223

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2002 NOAA Ship Ronald H. Brown CTD Station 11 (CTD011)

22-Jun-2002 14:49 Z

Latitude 26.500 N Longitude 73.200 W

5122

4650

4250

3849

3450

3100

2769

2469

2163

1868

1569

1319

868 839 820 669 544 420 319

99 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2002 NOAA Ship Ronald H. Brown CTD Station 12 (CTD012)

22-Jun-2002 20:10 Z

Latitude 26.500 N Longitude 73.583 W

5010

4598

4199

3799

3398

3000

2697

2398

2098

1798

1498

1280

1130 979 829

628 528 438 349 259 170 43 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)