0 5 10 15 20 25 30

0

50

100

150

200

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 1 (CTD001)

26-Apr-2001 20:22 Z

Latitude 27.016 N Longitude 79.921 W

140

126

77

49

24

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

800

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 2 (CTD002)

27-Apr-2001 11:27 Z

Latitude 26.435 N Longitude 78.667 W

749

649

449449

374

300

224

173

3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 3 (CTD003)

27-Apr-2001 13:02 Z

Latitude 26.331 N Longitude 78.714 W

676

548

450

351

250

174

123

48

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 4 (CTD004) 27-Apr-2001 14:18 Z

Latitude 26.245 N Longitude 78.770 W

509

434

359

319

279

249

179

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

350

400

450

500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 5 (CTD005)

27-Apr-2001 15:33 Z

Latitude 26.164 N Longitude 78.804 W

445

415

348

298

248

198

149

49

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

50

100

150

200

250

300

350

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 6 (CTD006)

27-Apr-2001 16:52 Z

Latitude 26.065 N Longitude 78.855 W

282

248248

198

150

48

1

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

800

900

1000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 7 (CTD007)

28-Apr-2001 06:18 Z

Latitude 26.499 N Longitude 76.913 W

969

798

648

548

449

346 306

248

199

148

99

48

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

100

200

300

400

500

600

700

800

900

1000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 8 (CTD008)

28-Apr-2001 10:26 Z

Latitude 26.511 N Longitude 76.842 W

996

900

750

625

500

399

309

224

160 119

60

2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 9 (CTD009)

28-Apr-2001 12:08 Z

Latitude 26.500 N Longitude 76.734 W

3901

3296

3000

2698

2399

2100

1802

1486

1199

1005 853 701 546 450 349 249 149 99 49 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 10 (CTD010)

28-Apr-2001 15:48 Z

Latitude 26.502 N Longitude 76.614 W

4788

4499

4246

3870

3498

3120

2747

2447

2147

1849

1550

1247

1046 896 749 600 484 354 276 200 151 100 49 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 11 (CTD011) 28-Apr-2001 22:24 Z

Latitude 26.500 N Longitude 76.480 W

4923

3800

3149

2801

2499

2199

1901

1603

1374

1174

803 652 503 401 301 224 160 110 54 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 12 (CTD012) 29-Apr-2001 02:52 Z

Latitude 26.504 N Longitude 76.303 W

4908

4795

4497

4047

3600

3198

2797

2450

2097

1799

1499

1198

950 824

551 460 370 230 175 120 60 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 13 (CTD013)

29-Apr-2001 07:20 Z

Latitude 26.502 N Longitude 76.118 W

4887

4848

4298

3633

3248

2898

2549

2200

1902

1600

1377

1150

927

724 560 450 349 219 159 109 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 14 (CTD014)

29-Apr-2001 12:09 Z

Latitude 26.503 N Longitude 75.917 W

4831

4618

4317

3922

3624

3223

2923

2599

2225

1924

1627

1400

1203

1050 953

750 576 460 361 228 173 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 15 (CTD015)

29-Apr-2001 19:30 Z

Latitude 26.509 N Longitude 75.707 W

4770

4394

3997

3697

3398

3100

2801

2501

2202

2002

1803

1603

1409

1206

1006

805

604 482 354 222 154 89 45 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 16 (CTD016)

30-Apr-2001 01:13 Z

Latitude 26.508 N Longitude 75.502 W

4760

4497

4199

3899

3599

3300

2999

2699

2450

2201

1950

1701

1452

1175

1050

851

649

458 344 259 179 109

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 17 (CTD017)

30-Apr-2001 06:07 Z

Latitude 26.503 N Longitude 75.303 W

4717

4296

3922

3571

2900

2621

2424

2223

2025

1824

1623

1224

1027

825

622 449 325 224 150 99 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 18 (CTD018)

30-Apr-2001 10:59 Z

Latitude 26.501 N Longitude 75.083 W

4685

4400

4249

3872

3499

3127

2749

2448

2152

1849

1549

1252

1049 901 749 601 474 350 275 183 148 98 47 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 19 (CTD019)

30-Apr-2001 16:12 Z

Latitude 26.497 N Longitude 74.802 W

4609

4345

4019

3695

3370

3049

2699

2343

2124

1921

1722

1522

1322

1126

922

724 549 381 262 191 145 90 45 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 20 (CTD020)

30-Apr-2001 21:32 Z

Latitude 26.502 N Longitude 74.515 W

4558

4235

3874

3599

3348

3097

2846

2599

2371

2124

1974

1622

1399

1175

976

777 627 477 386 294 212 162 110 60

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 21 (CTD021)

01-May-2001 03:11 Z

Latitude 26.503 N Longitude 74.249 W

4607

4397

4097

3795

3498

3197

2899

2598

2388

2187

1989

1790

1488

1289

989

661 529 399 272 171 170 113 54

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 22 (CTD022)

01-May-2001 08:27 Z

Latitude 26.502 N Longitude 73.966 W

4715

4448

4198

3899

3123

2747

2447

2148

1842

1550

1251

1048 900 749 599

351 248 202 150 100 50

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000 Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 23 (CTD023) 01-May-2001 14:17 Z

Latitude 26.501 N Longitude 73.582 W

4936

4799

4550

4146

3799

3497

3148

2799

2550

2250

1899

1583

1273

850 699 550 400 300 225 160 111 50 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78) 100 150 200 250 Oxygen (umol/kg) 22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 24 (CTD024)

01-May-2001 19:24 Z

Latitude 26.500 N Longitude 73.219 W

5134

4900

4601

4249

3899

3549

3249

2948

2650

2347

2050

1751

1425

1102

877 726 575 425 275 211 148 99 50 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 25 (CTD025)

02-May-2001 15:44 Z

Latitude 26.560 N Longitude 72.851 W

5164

4997

4698

4300

3949

3598

3199

2899

2599

2300

2000

1700

1399

1148

899 749 601 452 301 202 154 111 60 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 26 (CTD026)

02-May-2001 22:27 Z

Latitude 26.502 N Longitude 72.465 W

5235

5098

4498

4196

3799

3400

2997

2694

2400

2100

1798

1449

901 698 549 400 311 241 179 119 4

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 27 (CTD027)

03-May-2001 04:27 Z

Latitude 26.500 N Longitude 72.102 W

5365

5199

4902

4596

4298

3898

3498

3098

2800

2499

2200

1899

1495

1200 998 802 614 502 353 249 149 100 49 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 28 (CTD028)

03-May-2001 11:21 Z

Latitude 26.503 N Longitude 71.732 W

5468

5301

4698

4395

4094

3698

3297

2898

2600

2299

2001

1300

1053 850

599 450 299 250 173 118 58 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 29 (CTD029)

03-May-2001 18:08 Z

Latitude 26.503 N Longitude 71.351 W

5583

5347

5100

4799

4497

4199

3798

3399

3000

2699

2399

2051

1699

1400

1099 924

673 526 375 275 166 54 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 30 (CTD030)

04-May-2001 00:38 Z

Latitude 26.504 N Longitude 71.002 W

5582

5196

4897

4547

4198

3851

3498

3150

2803

2500

2200

1903

1650

1401

1152

898 703 552

326 225 149 89 44 2

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 31 (CTD031)

04-May-2001 09:29 Z

Latitude 26.505 N Longitude 70.683 W

5590

5297

4599

4297

3899

3548

3200

2850

2450

2048

1697

1373

1102 950 754 651 502 349 160 110 58 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 32 (CTD032)

04-May-2001 16:07 Z

Latitude 26.500 N Longitude 70.232 W

5592

5397

5097

4799

4450

4104

3673

3250

2850

2499

2150

1799

1552

1298

1049

799 649 527 401 279 151 99 49 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)

0 5 10 15 20 25 30

0

1000

2000

3000

4000

5000

Potential Temperature (Deg. C)

Pressure (dbar)

Abaco 2001 RV Oceanus CTD Station 33 (CTD033)

04-May-2001 22:41 Z

Latitude 26.501 N Longitude 69.832 W

5592

5198

4846

4499

4199

3900

3599

3299

3000

2651

2301

1950

1253

1051 900 750 601 451 302 183 109 55 3

34 34.5 35 35.5 36 36.5 37 Salinity (PSS-78)

100 150 200 250 Oxygen (umol/kg)

22 23 24 25 26 27 28 Sigma-Theta (kg/m3)

34 35 36 37 0 5 10 15 20 25 30

Salinity (PSS-78)

Potential Temperature (deg C)

100 150 200 250 0 5 10 15 20 25 30

Oxygen (umol/kg)

100 150 200 250 34 34.5 35 35.5 36 36.5 37

Oxygen (umol/kg)

Salinity (PSS-78)