12/31 01/02 01/04 01/06 01/08 01/10 01/12 01/14 01/16 01/18 01/20 01/22 01/24 01/26 01/28 01/30 15

20

25 W A T E R T E M P E R A T U R E ( °C )

NOAA SF-ROS Monitoring Station ’7MB’ - Moser Channel, Florida^{time-series data (gmt), monthly composite}

plot generated at 20:46 gmt on 01/30/2009

12/31 01/02 01/04 01/06 01/08 01/10 01/12 01/14 01/16 01/18 01/20 01/22 01/24 01/26 01/28 01/30 34 35 36 37 38 S A L I N I T Y ( P S U )

12/31 01/02 01/04 01/06 01/08 01/10 01/12 01/14 01/16 01/18 01/20 01/22 01/24 01/26 01/28 01/30 0 1 2 3 4 5 F L U O R E S C E N C E ( V O L T S )

12/31 01/02 01/04 01/06 01/08 01/10 01/12 01/14 01/16 01/18 01/20 01/22 01/24 01/26 01/28 01/30 0 1 2 3 4 5 T R A N S M I T T A N C E ( V O L T S )

A real-time product of NOAA/AOML and UM/RSMAS in Miami, Florida. This product should be considered PRELIMINARY, and is inten ded for general scientific interest only! NOAA/AOML and the UM/RSMAS cannot be held liable for the use of this product in any other manner. For further information, c ontact ryan.smith@noaa.gov.