-250-225-200-175-150-125-100-75-50-25 0 255075100125150175200225250

0

20

40

60

80

100

120

140

160

180

200

EAST/WEST COMPONENT (u)

CURRENT VELOCITY (cm/s)

DEPTH (m)

LADCP STN: ABC01000 - LOCATION: LAT 26 26.738 N LON 79 55.470 W - TIME: 17:03:28z / 116 / 2000

-250-225-200-175-150-125-100-75-50-25 0 255075100125150175200225250

0

20

40

60

80

100

120

140

160

180

200

NORTH/SOUTH COMPONENT (v)

CURRENT VELOCITY (cm/s)