21.75 21.8 21.85 21.9

0 100 200 300 400 500 600 700 800

RP

Depth (m)

0 0.2 0.4 0.6 0.8 1

0 100 200 300 400 500 600 700 800

RP: XBT1-XBT2

-5 0 5 10 15 20

0 100 200 300 400 500 600 700 800

RP: XBT1-CTD

-5 0 5 10 15 20

0 100 200 300 400 500 600 700 800

RP: XBT2-CTD