1 4 7 10 13 16 19 22 25 28 31 34 37 40 43 46 49 52 55 58 -2 0 2 4 6

Cast

C-delay [1/16 s -1]

Cross Correlation

S/N 70200059 S/N 70200054

-100 -80 -60 -40 -20 0 20 40 60 80 100 -1

0

1

Scan [1/16 s^{-1} ]

Correlation

Cast 30 Cast 35 Cast 60

-100 -80 -60 -40 -20 0 20 40 60 80 100 -1

0

1

Scan [1/16 s^{-1} ]

Cast 40 Cast 44