-200 -150 -100 -50 0 50 100 150 200

-200

-150

-100 -50 0 50 100 150 200

Total deposition (μg m^{-2} s^{-1} )

Zonal deposition ( μg m-2 s-1)

Zonal: 0.5±0.3 Total: 1.8±0.3

June-September

-200 -150 -100 -50 0 50 100 150 200

-200

-150

-100 -50 0 50 100 150 200

Total deposition (μg m^{-2} s^{-1} )

Zonal: -1.6±0.1 Total: 0.1±0.1

October-May