2006 2008 2010 2012

-2

-1

0

1

2

3

Heat Transport, PW (10 15 W)

2.5

1.37

0.31

-1.51

2.49

1.36

0.36

-1.44

2.52

1.29

0.38

-1.58

2.54

1.3

0.42

-1.7

2.51

1.08

0.33

-1.69

2.43

1.08

0.2

-1.48

2.47

1.28

0.4

-1.54

Jan Feb Mar Apr May Jun Jul Aug Sep Oct Nov Dec

-0.5

0

0.5

1

1.5

2

2.5 2012: median 1.14± 0.12 PW 2011: median 1.28± 0.089 PW