0 12 24 36 48 60 72 84 96 108 120 132 Forecast Lead Time (h) -40 -30 -20 -10 0 10 20 30 40

Skill (%)

Mean: 4.69%

0 100 200 300 400

MDAE (km)

CV31 CNTL

55 53 48 45 42 36 35 35 33 33 31 0

# fcsts