0 12 24 36 48 60 72 84 96 108 120 132 Forecast Lead Time (h) -60 -30 0 30 60

Skill (%)

Mean: 1.19%

156 161 157 149 159 136 131 134 127 125 119 0

# fcsts

0

50

100

MAE (km)

CV31 CNTL